\documentclass[12pt,a4paper]{article}
\usepackage[top=0.75in, bottom=0.75in, left=0.75in, right=0.75in]{geometry}
\usepackage{xurl}
\usepackage[utf8]{inputenc}
\usepackage{xeCJK}
\setCJKmainfont{TW-Kai}
\setCJKmonofont{Noto Sans Mono CJK TC}
\usepackage{graphicx}
\usepackage{subcaption}
\usepackage{amsmath}
\usepackage{listings}
\usepackage{xcolor}
\usepackage{booktabs}
\usepackage[backend=biber, sorting=none]{biblatex}
% \graphicspath{ {./img/} }
% \addbibresource{ref.bib}
% \printbibliography


\lstset{ % General setup for the package
    language=C,
    basicstyle=\footnotesize\ttfamily,
    numbers=left,
     numberstyle=\small,
    frame=tb,
    tabsize=4,
    columns=fixed,
    showstringspaces=false,
    showtabs=false,
    keepspaces,
    commentstyle=\color{gray},
    keywordstyle=\color{blue}
}

\author{Your name}
\title{Title}

\begin{document}

\maketitle
\newpage

\end{document}

% \begin{itemize}
%   \item Icarus Verilog Wiki: Getting Started \url{https://iverilog.fandom.com/wiki/Getting_Started}
%   \item Icarus Verilog Wiki: GTKWave \url{https://iverilog.fandom.com/wiki/GTKWave}
%   \item Verilog HDL 教學講義 \url{https://hom-wang.gitbooks.io/verilog-hdl/content/index.html}
%   \item Wikipedia: Adder \url{https://en.wikipedia.org/wiki/Adder_(electronics)}
% \end{itemize}

% \begin{figure}[h]
%   \includegraphics[width=0.7\linewidth]{ripple.jpg}
%   \centering
%   \caption{漣波計數器電路圖}
% \end{figure}

% \lstinputlisting[linerange={41-51}]{week4-4.ino}

% \begin{lstlisting}
% \end{lstlisting}


% \begin{table}[h!]
%   \begin{center}
%     \caption{全加器真值表}
%     \begin{tabular}{c|c|c|c|c}
%       \toprule
%       A & B & $C_{in}$ & $C_{out}$ & S \\
%       \midrule
%       0 & 0 & 0 & 0 & 0 \\
%       1 & 0 & 0 & 0 & 1 \\
%       0 & 1 & 0 & 0 & 1 \\
%       1 & 1 & 0 & 1 & 0 \\
%       0 & 0 & 1 & 0 & 1 \\
%       1 & 0 & 1 & 1 & 0 \\
%       0 & 1 & 1 & 1 & 0 \\
%       1 & 1 & 1 & 1 & 1 \\
%       0 & 0 & 0 & 0 & 0 \\
%       \bottomrule
%     \end{tabular}
%   \end{center}
% \end{table}

% \begin{titlepage}
%   \begin{center}
%     \vspace*{1cm}
% 
%     \Huge
%     \textbf{臺北科技大學}
% 
%     \vspace{0.5cm}
%     \textbf{機電整合實驗三}
% 
%     \vspace{1.5cm}
% 
%     \textbf{}
% 
%     \vspace*{\fill}
% 
%     \begin{flushleft}
%       \large
%       110 學年度第 2 學期\\
%       智慧自動化控制科 三年級\\
%       學號：1082B0004、1082B0006 \\
%       姓名：劉予安、林宏信\\
%       課程名稱：機電整合與實習\\
%       授課老師：李政宏 博士\\
%     \end{flushleft}
%   \end{center}
% \end{titlepage}
% 
